From 6b88e3535a04e14a783684909280be8640603c1b Mon Sep 17 00:00:00 2001
From: Siddharth Ravikumar <sravik@bgsu.edu>
Date: Tue, 22 Mar 2016 10:16:31 -0400
Subject: Update figure captions.

 - Now they don't overflow out of the page in PDF.
---
 report/chapters/3-arch-d.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'report/chapters/3-arch-d.tex')

diff --git a/report/chapters/3-arch-d.tex b/report/chapters/3-arch-d.tex
index e1a84fd..307be25 100644
--- a/report/chapters/3-arch-d.tex
+++ b/report/chapters/3-arch-d.tex
@@ -28,8 +28,8 @@ place under their directories to their respective data store.
 
 \begin{figure}[h]
   \includegraphics[scale=0.6]{3-combox-structure}
-  \caption{High level overview of how file creation works when combox
-    is setup on two computers.}
+  \caption{Overview of how file creation works when combox is setup on
+    two computers.}
   \label{fig:3-combox-structure}
 \end{figure}
 
-- 
cgit v1.2.3

