From d61e7f3171ef9992cfc7cce2d59287dca18e5ed1 Mon Sep 17 00:00:00 2001
From: Siddharth Ravikumar <sravik@bgsu.edu>
Date: Tue, 9 Feb 2016 11:03:21 -0500
Subject: Fixed typo in section 4.5

	modified:   report/chapters/4-arch-d.tex
	modified:   report/combox-report.pdf
---
 report/chapters/4-arch-d.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'report/chapters/4-arch-d.tex')

diff --git a/report/chapters/4-arch-d.tex b/report/chapters/4-arch-d.tex
index 41ce1da..455a55a 100644
--- a/report/chapters/4-arch-d.tex
+++ b/report/chapters/4-arch-d.tex
@@ -199,7 +199,8 @@ At the time of writing the report, combox is in version \verb+0.2.2+
 and it still not compatible with Windows. Comprehensive documentation
 of setting up the development environment for combox on Windows was
 written\cite{doc:combox-setup-windoze} to make it less cumbersome for
-anyone would want to work on making combox compatible with Windows.
+anyone who would want to work on making combox compatible with
+Windows.
 
 \section{combox as a python package}\label{4-pypi}
 
-- 
cgit v1.2.3

