From 765b3a33f4254ba46e8b75e80a54834259674430 Mon Sep 17 00:00:00 2001
From: Siddharth Ravikumar <sravik@bgsu.edu>
Date: Tue, 22 Mar 2016 09:08:50 -0400
Subject: Update chapter 4 based on Dr. Green' feedback.

 - Floating numbers now have only two significant figures.
---
 report/chapters/4-testing.tex | 62 +++++++++++++++++++++----------------------
 1 file changed, 31 insertions(+), 31 deletions(-)

(limited to 'report/chapters/4-testing.tex')

diff --git a/report/chapters/4-testing.tex b/report/chapters/4-testing.tex
index bf57e73..b55db56 100644
--- a/report/chapters/4-testing.tex
+++ b/report/chapters/4-testing.tex
@@ -474,11 +474,11 @@ start time of processing & 11:00:54\\
 end time of processing & 11:01:38\\
 total time taken to process all files & 00:00:44\\
 no. of files & 27\\
-total size of all files & 445433187.000000 bytes (424.798190MiB)\\
-avg. file size & 16497525.000000 bytes (15.733266MiB)\\
-avg. time to split and encrypt a file & 352.583370 ms\\
+total size of all files & 445433187.00 bytes (424.79MiB)\\
+avg. file size & 16497525.00 bytes (15.73MiB)\\
+avg. time to split and encrypt a file & 352.58 ms\\
 \end{tabular}
-\caption{Stress Testing combox - flac dump (27 files - 424.798190MiB) to combox directory}
+\caption{Stress Testing combox - flac dump (27 files - 424.79MiB) to combox directory}
 \end{table}
 \end{center}
 
@@ -487,10 +487,10 @@ avg. time to split and encrypt a file & 352.583370 ms\\
 \begin{itemize}
 \item Total time to process all files was faster by 1min3secs.
 \item Average time to split and encrypt a file reduced by
-  28.337963000000002ms.
+  28.33ms.
 \end{itemize}
 
-\subsection{20MiB - 90MiB dump (27 files - 1620.000000MiB)}\label{4-st-1620}
+\subsection{20MiB - 90MiB dump (27 files - 1620.00MiB)}\label{4-st-1620}
 
 \begin{center}
 \begin{table}[h]
@@ -502,11 +502,11 @@ start time of processing & 12:26:45\\
 end time of processing & 12:29:07\\
 total time taken to process all files & 00:02:22\\
 no. of files & 27\\
-total size of all files & 1698693120.000000 bytes (1620.000000MiB)\\
-avg. file size & 62914560.000000 bytes (60.000000MiB)\\
-avg. time to split and encrypt a file & 2670.596556ms\\
+total size of all files & 1698693120.00 bytes (1620.00MiB)\\
+avg. file size & 62914560.00 bytes (60.00iB)\\
+avg. time to split and encrypt a file & 2670.59ms\\
 \end{tabular}
-\caption{Stress Testing combox - 20MiB - 90MiB dump (27 files - 1620.000000MiB) to combox directory}
+\caption{Stress Testing combox - 20MiB - 90MiB dump (27 files - 1620.00MiB) to combox directory}
 \end{table}
 \end{center}
 
@@ -515,10 +515,10 @@ avg. time to split and encrypt a file & 2670.596556ms\\
 \begin{itemize}
 \item Total time to process all files was slower by 4secs.
 \item Average time to split and encrypt a file reduced by
-   25.52536999999984ms.
+   25.52ms.
 \end{itemize}
 
-\subsection{20MiB - 90MiB dump (99 files - 5940.000000MiB)}\label{4-st-5940}
+\subsection{20MiB - 90MiB dump (99 files - 5940.00MiB)}\label{4-st-5940}
 
 \begin{center}
 \begin{table}[h]
@@ -530,11 +530,11 @@ start time of processing & 13:10:16\\
 end time of processing & 13:19:26\\
 total time taken to process all files & 00:09:10\\
 no. of files & 99\\
-total size of all files & 6228541440.000000 bytes (5940.000000MiB)\\
-avg. file size & 62914560.000000 bytes (60.000000MiB)\\
-avg. time to split and encrypt a file & 2979.647586ms\\
+total size of all files & 6228541440.00 bytes (5940.00MiB)\\
+avg. file size & 62914560.00 bytes (60.00MiB)\\
+avg. time to split and encrypt a file & 2979.64ms\\
 \end{tabular}
-\caption{Stress Testing combox - 20MiB - 90MiB dump (99 files - 5940.000000MiB) - to combox directory}
+\caption{Stress Testing combox - 20MiB - 90MiB dump (99 files - 5940.00MiB) - to combox directory}
 \end{table}
 \end{center}
 
@@ -543,10 +543,10 @@ avg. time to split and encrypt a file & 2979.647586ms\\
 \begin{itemize}
 \item Total time to process all files was faster by 59secs.
 \item Average time to split and encrypt a file increased by
-  206.20906100000002ms.
+  206.20ms.
 \end{itemize}
 
-\subsection{20MiB - 90MiB dump (180 files - 10800.000000MiB)}\label{4-st-10800}
+\subsection{20MiB - 90MiB dump (180 files - 10800.00MiB)}\label{4-st-10800}
 
 \begin{center}
 \begin{table}[h]
@@ -558,11 +558,11 @@ start time of processing & 13:42:06\\
 end time of processing & 14:00:10\\
 total time taken to process all files & 00:18:04\\
 no. of files & 180\\
-total size of all files & 11324620800.000000 bytes (10800.000000MiB)\\
-avg. file size & 62914560.000000 bytes (60.000000MiB)\\
-avg. time to split and encrypt a file & 3423.087539ms\\
+total size of all files & 11324620800.00 bytes (10800.00MiB)\\
+avg. file size & 62914560.00 bytes (60.00MiB)\\
+avg. time to split and encrypt a file & 3423.08ms\\
 \end{tabular}
-\caption{Stress Testing combox - 20MiB - 90MiB dump (180 files - 10800.000000MiB) to combox directory}
+\caption{Stress Testing combox - 20MiB - 90MiB dump (180 files - 10800.00MiB) to combox directory}
 \end{table}
 \end{center}
 
@@ -571,7 +571,7 @@ avg. time to split and encrypt a file & 3423.087539ms\\
 \begin{itemize}
 \item Total time to process all files was slower by 1min2secs
 \item Average time to split and encrypt a file increased by
-  399.87623299999996ms.
+  399.87ms.
 \end{itemize}
 
 \subsection{Tools used}\label{4-st-tu}
@@ -614,11 +614,11 @@ testing\footnote{https://git.ricketyspace.net/combox-paper/plain/notes/benchmark
     file dump'' is the total size of all files in a given file dump.}.
 \item Figure \ref{fig:4-st-atsae} show the average time it takes
   combox to split and encrypt a file for a given file dump. There is a
-  steep increase in the average time from the \verb+424.798190MiB+
-  dump and the \verb+1620.000000MiB+ dump, after which the average
+  steep increase in the average time from the \verb+424.79MiB+
+  dump and the \verb+1620.00MiB+ dump, after which the average
   time to split and encrypt a file seems to almost linearly increase;
   The main reason for this is that the average file size for dumps
-  from \verb+1620.000000MiB+ to \verb+10800.000000MiB+ are the same.
+  from \verb+1620.00MiB+ to \verb+10800.00MiB+ are the same.
 \end{itemize}
 
 \begin{figure}[h]
@@ -640,16 +640,16 @@ testing\footnote{https://git.ricketyspace.net/combox-paper/plain/notes/benchmark
   amount of time taken to process all files for a given file dump in
   the \verb+2016-01-16+ and \verb+2015-11-8+ stress test. The amount
   of time needed to process all fills seems to be reduced for the
-  \verb+5940.000000MiB+ file dump when compared to the \verb+2015+
+  \verb+5940.00MiB+ file dump when compared to the \verb+2015+
   stress test results and it seems to be slightly higher for the
-  \verb+10800.000000MiB+ file dump when compared to the \verb+2015+
+  \verb+10800.00MiB+ file dump when compared to the \verb+2015+
   stress test.
 \item Similarly, figure \ref{fig:4-st-atsae-diff} shows the graphs for
   the average time to split and encrypt for a given file dump in the
   \verb+2016-01-16+ and the \verb+2015-11-8+ stress test. The average
-  time taken seems to be almost the same for the \verb+424.798190MiB+
-  and the \verb+1620.000000+ dump, but for the \verb+5940.000000MiB+
-  and the \verb+10800.000000MiB+ dump the average time taken seems to
+  time taken seems to be almost the same for the \verb+424.79MiB+
+  and the \verb+1620.00+ dump, but for the \verb+5940.00MiB+
+  and the \verb+10800.00MiB+ dump the average time taken seems to
   higher for the \verb+2016+ stress test when compared to the
   \verb+2015+ stress test.
 \end{itemize}
-- 
cgit v1.2.3

