From ca00511806e4b5c37559deeb5230e487b2bb82bc Mon Sep 17 00:00:00 2001
From: Siddharth Ravikumar <sravik@bgsu.edu>
Date: Tue, 22 Mar 2016 10:08:57 -0400
Subject: Update table captions.

 - Now, they don't overflow out of the page in PDF.
---
 report/chapters/4-testing.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'report/chapters/4-testing.tex')

diff --git a/report/chapters/4-testing.tex b/report/chapters/4-testing.tex
index a43ab3e..b0d91da 100644
--- a/report/chapters/4-testing.tex
+++ b/report/chapters/4-testing.tex
@@ -484,7 +484,7 @@ tests.
       avg. file size & 16497525.00 bytes (15.73MiB)\\
       avg. time to split and encrypt a file & 352.58 ms\\
     \end{tabular}
-    \caption{Stress Testing combox - flac dump (27 files - 424.79MiB) to combox directory}
+    \caption{Stress Testing combox - flac dump (424.79MiB)}
   \end{table}
 \end{center}
 
@@ -512,7 +512,7 @@ tests.
       avg. file size & 62914560.00 bytes (60.00iB)\\
       avg. time to split and encrypt a file & 2670.59ms\\
     \end{tabular}
-    \caption{Stress Testing combox - 20MiB - 90MiB dump (27 files - 1620.00MiB) to combox directory}
+    \caption{Stress Testing combox - 20MiB - 90MiB dump (1620.00MiB)}
   \end{table}
 \end{center}
 
@@ -540,7 +540,7 @@ tests.
       avg. file size & 62914560.00 bytes (60.00MiB)\\
       avg. time to split and encrypt a file & 2979.64ms\\
     \end{tabular}
-    \caption{Stress Testing combox - 20MiB - 90MiB dump (99 files - 5940.00MiB) - to combox directory}
+    \caption{Stress Testing combox - 20MiB - 90MiB dump (5940.00MiB)}
   \end{table}
 \end{center}
 
@@ -568,7 +568,7 @@ tests.
       avg. file size & 62914560.00 bytes (60.00MiB)\\
       avg. time to split and encrypt a file & 3423.08ms\\
     \end{tabular}
-    \caption{Stress Testing combox - 20MiB - 90MiB dump (180 files - 10800.00MiB) to combox directory}
+    \caption{Stress Testing combox - 20MiB - 90MiB dump (10800.00MiB)}
   \end{table}
 \end{center}
 
-- 
cgit v1.2.3

