From 59939370fc87ce1b17caec9c468948c657cafe4b Mon Sep 17 00:00:00 2001
From: Siddharth Ravikumar <sravik@bgsu.edu>
Date: Tue, 9 Feb 2016 11:00:39 -0500
Subject: Drafted sections 4.5, 4.6 and 4.7

---
 report/chapters/5-testing.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'report/chapters/5-testing.tex')

diff --git a/report/chapters/5-testing.tex b/report/chapters/5-testing.tex
index 7d6f76a..e6376f1 100644
--- a/report/chapters/5-testing.tex
+++ b/report/chapters/5-testing.tex
@@ -1,9 +1,9 @@
-\chapter{Testing}
+\chapter{Testing}\label{ch:5}
 
 \epigraph{Testing shows the presence, not the absence of
   bugs.}{\textit{Dijkstra}\cite{dijkstra69}}
 
-\section{Unit testing}
+\section{Unit testing}\label{sec:5-unit-testing}
 
 The \verb+nose+\cite{pylib:nose} testing framework was used to
 write unit tests for the functions and classes part of the
@@ -66,7 +66,7 @@ Unit tests failed to reveal bugs \#4, \#5 \#6 \#7 \#5 \#10
 \#11\cite{combox-issue-tracker}; these bugs were found when manually
 testing combox.
 
-\section{Manual testing}
+\section{Manual testing}\label{sec:5-manual-testing}
 
 The unit tests for the \verb+combox.events+ module test the
 correctness of the \verb+ComboxDirMonitor+ and \verb+NodeDirMonitor+
-- 
cgit v1.2.3

